Conference Talks: “By the Blood Ye Are Sanctified”: The Symbolic, Salvific, Interrelated, Additive, Retrospective, and Anticipatory Nature of the Ordinances of Spiritual Rebirth in John 3 and Moses 6

Presented at:

2016 Temple on Mount Zion Conference
Saturday, November 5, 20164
https://interpreterfoundation.org/conferences/2016-temple-on-mount-zion-conference/

Conference Proceedings:

Sacred Time, Sacred Space, & Sacred Meaning at https://interpreterfoundation.org/books/sacred-time-sacred-space-sacred-meaning/

Listen to an audio recording of this talk:

https://cdn.interpreterfoundation.org/ifaudio/2016TMZ-Bradshaw.mp3

Download audio recording

Contents