Life Sciences Panel Discussion at Science & Mormonism Conference 2013

This is a video of the Life Sciences Panel Discussion at the Science & Mormonism: Cosmos, Earth & Man symposium, including Michael R. Stark, Emily Bates, R. Paul Evans, Steven L. Peck, and Trent D. Stephens, which took place on November 9, 2013.

This is also available as an audio podcast, and will be included in the podcast feed. You can listen by pressing the play button or download the podcast below:

http://cdn.interpreterfoundation.org/ifpodcasts/Life-Sciences-Panel-Discussion-at-Science-Mormonism-Conference.mp3

Podcast: Download (Duration: 1:23:52 — 28.8MB)

Subscribe: RSS | More

Contents