Conference Talks: Life Sciences Panel Discussion

This panel, comprised of five Latter-day Saint scholars in the Life Sciences (Emily Bates, R. Paul Evans, Steven L. Peck, Michael R. Stark, and Trent D. Stephens), provides personal perspectives on the development of their ideas and their affinities for their professional work. Following these perspectives, they answer a pot pourri of audience questions.

Presented at:

2013 Interpreter Symposium on Science & Mormonism: Cosmos, Earth & Man
Saturday, November 9, 2013
https://interpreterfoundation.org/conferences/2013-symposium-science-mormonism-cosmos-earth-man/

Article Reprint:

Life Sciences Panel, The Interpreter Foundation, February 17, 2020
https://interpreterfoundation.org/reprint-sm1-17-life-sciences-panel/

Conference Proceedings:

Cosmos, Earth, and Man at https://interpreterfoundation.org/books/science-and-mormonism-cosmos-earth-and-man/

Listen to an audio recording of this talk:

https://cdn.interpreterfoundation.org/ifaudio/2013S_M-panel.mp3

Download PDF

Download audio recording

Contents