The Interpreter Foundation Has 501c3 Tax-Exempt Status

The Interpreter Foundation is pleased to announce that, in a communication dated 24 January 2014, the Internal Revenue Service of the United States has determined the Foundation to be a “public charity” that is exempt from Federal income tax under section 501 (c) (3) of the Internal Revenue Code. Contributions to the Foundation are deductible under section 170 of the Code. The Foundation is also qualified to receive tax-deductible bequests, devises, transfers, or gifts under sections 2055, 2106, and/or 2522 of the Code.

Importantly, too, this tax exemption applies retroactively, back to August 2012.

Contents